Figure 6: High reflectance environment rendered with GSII. Left: radiosity solution for normal+ simple surfaces. Center: direct illumination . Right: direct + indirect illuminatio n.

Figure 7: Details of high reflectance environment rendere d with GSII. Left: computer screen and keyboard sitting on table on the left side of the images in Fig. 6. Center: pencils and thumbtacks on the table next to the computer. Right: plant and radio that appear in the back left of the images in Fig. 6

Figure 8: High reflectance environment rendered with alternative methods. Left: radiosity solution for complete environment. Center : PMM solution, using the complete rad iosity solution. Right: MCPT solution.